UPDATE `creature` SET `phaseMask` = '4294967295', `curhealth` = '48700' WHERE `guid` = '207219';
UPDATE `creature` SET `phaseMask` = '4294967295', `curhealth` = '50400' WHERE `guid` = '207216';
UPDATE `creature` SET `phaseMask` = '4294967295', `modelid` = '0' WHERE `guid` = '121136';
UPDATE `creature` SET `phaseMask` = '4294967295', `position_x` = '7184.44', `position_y` = '-3520.87', `position_z` = '826.973', `orientation` = '2.05304', `curhealth` = '50400' WHERE `guid` = '1975964';
UPDATE `creature` SET `position_x` = '-1105.58', `position_y` = '1715.78', `position_z` = '89.985', `orientation` = '4.12877' WHERE `guid` = '202694';
UPDATE `creature` SET `position_x` = '1192.9', `position_y` = '657.956', `position_z` = '196.236', `orientation` = '4.02512' WHERE `guid` = '126801';
UPDATE `creature` SET `position_x` = '-3104.01', `position_y` = '4932.99', `position_z` = '-98.7672', `orientation` = '5.61868' WHERE `guid` = '84498';
UPDATE `creature` SET `position_x` = '-3122.8', `position_y` = '4927.39', `position_z` = '-98.5405', `orientation` = '3.10148' WHERE `guid` = '84507';
UPDATE `creature` SET `position_x` = '4747.03', `position_y` = '207.543', `position_z` = '53.5678', `orientation` = '4.50556' WHERE `guid` = '37101';
UPDATE `creature` SET `position_x` = '5855.6', `position_y` = '648.584', `position_z` = '647.491', `orientation` = '0.109359' WHERE `guid` = '109735';
