UPDATE script_texts SET content_default='Emergency power activated! Initializing ambulanory motor! CLUCK!' WHERE entry = -1000287;
UPDATE script_texts SET comment='oox SAY_OOX_START' WHERE entry = -1000287;
UPDATE script_texts SET comment='oox SAY_OOX_AGGRO1' WHERE entry = -1000288;
UPDATE script_texts SET comment='oox SAY_OOX_AGGRO2' WHERE entry = -1000289;
UPDATE script_texts SET comment='oox SAY_OOX_AMBUSH' WHERE entry = -1000290;
UPDATE script_texts SET comment='oox SAY_OOX17_AMBUSH_REPLY' WHERE entry = -1000291;
UPDATE script_texts SET comment='oox SAY_OOX_END' WHERE entry = -1000292;
UPDATE script_texts SET content_default='REUSE', comment='REUSE' WHERE entry = -1060000;
UPDATE script_texts SET content_default='REUSE', comment='REUSE' WHERE entry = -1060001;
UPDATE script_texts SET content_default='REUSE', comment='REUSE' WHERE entry = -1060002;
UPDATE script_texts SET content_default='REUSE', comment='REUSE' WHERE entry = -1060003;
UPDATE script_texts SET content_default='REUSE', comment='REUSE' WHERE entry = -1060004;
UPDATE script_texts SET content_default='REUSE', comment='REUSE' WHERE entry = -1060005;
UPDATE script_texts SET content_default='REUSE', comment='REUSE' WHERE entry = -1000416;
UPDATE script_texts SET content_default='REUSE', comment='REUSE' WHERE entry = -1000417;
UPDATE script_texts SET content_default='REUSE', comment='REUSE' WHERE entry = -1000418;
UPDATE script_texts SET content_default='REUSE', comment='REUSE' WHERE entry = -1000419;
