/*
SQLyog Professional v13.1.7 (64 bit)
MySQL - 8.0.21 : Database - asc_world_new
*********************************************************************
*/

/*!40101 SET NAMES utf8 */;

/*!40101 SET SQL_MODE=''*/;

/*!40014 SET @OLD_UNIQUE_CHECKS=@@UNIQUE_CHECKS, UNIQUE_CHECKS=0 */;
/*!40014 SET @OLD_FOREIGN_KEY_CHECKS=@@FOREIGN_KEY_CHECKS, FOREIGN_KEY_CHECKS=0 */;
/*!40101 SET @OLD_SQL_MODE=@@SQL_MODE, SQL_MODE='NO_AUTO_VALUE_ON_ZERO' */;
/*!40111 SET @OLD_SQL_NOTES=@@SQL_NOTES, SQL_NOTES=0 */;
/*Table structure for table `spell_coefficient_override` */

CREATE TABLE `spell_coefficient_override` (
  `spell_id` int unsigned NOT NULL DEFAULT '0',
  `min_build` int NOT NULL DEFAULT '12340',
  `max_build` int NOT NULL DEFAULT '12340',
  `direct_coefficient` float NOT NULL DEFAULT '-1',
  `overtime_coefficient` float NOT NULL DEFAULT '-1',
  `description` varchar(100) CHARACTER SET utf8mb4 COLLATE utf8mb4_unicode_ci DEFAULT NULL,
  PRIMARY KEY (`spell_id`,`min_build`),
  UNIQUE KEY `unique_index` (`spell_id`,`min_build`) USING BTREE,
  KEY `spell_id` (`spell_id`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COLLATE=utf8mb4_unicode_ci COMMENT='Spell System';

/*Data for the table `spell_coefficient_override` */

/*!40101 SET SQL_MODE=@OLD_SQL_MODE */;
/*!40014 SET FOREIGN_KEY_CHECKS=@OLD_FOREIGN_KEY_CHECKS */;
/*!40014 SET UNIQUE_CHECKS=@OLD_UNIQUE_CHECKS */;
/*!40111 SET SQL_NOTES=@OLD_SQL_NOTES */;
